282 Experimental Mathematics, Vol. 1 (1992), No. 4

FIGURE 3. Waveform for R = 125.347558 in the region [�.75, .75] � [.75, 3.75], using the same color maps and same normalization as Figure 2. The maximum is 1.618, at (^1_2 , 2.024) (marked by a black dot on the left), and the minimum is �1.456, at (0, 1.486).